/*
Navicat MySQL Data Transfer

Source Server         : ipu测试-121.42.183.206
Source Server Version : 50625
Source Host           : 121.42.183.206:3307
Source Database       : test

Target Server Type    : MYSQL
Target Server Version : 50625
File Encoding         : 65001

Date: 2019-03-03 00:08:09
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for ipu_db_demo
-- ----------------------------
DROP TABLE IF EXISTS `ipu_db_demo`;
CREATE TABLE `ipu_db_demo` (
  `pk` int(255) NOT NULL COMMENT '主键',
  `string_type` varchar(255) NOT NULL COMMENT '字符串字段',
  `int_type` int(255) NOT NULL COMMENT '整型字段',
  `decimal_type` decimal(4,2) NOT NULL COMMENT '小数值字段',
  `date_type` date NOT NULL COMMENT '日期字段',
  `datetime_type` datetime NOT NULL COMMENT '日期时间字段',
  PRIMARY KEY (`pk`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;
